-- disable completely
SET CLUSTER SETTING timeseries.storage.enabled = false;
SET CLUSTER SETTING timeseries.storage.resolution_10s.ttl = '0s';
SET CLUSTER SETTING timeseries.storage.resolution_30m.ttl = '0s';
